Re: Alternative sources for commentaries

I have recently cancelled my RUK online feed as, at its best, it was 32 seconds behind “live”.

I’m currently using William Hill radio online and that, for me, is about 1-2 seconds late at most.
Statistics: Posted by TraderGray — Fri May 15, 2009 7:00 pm