Re: Closed betfair account

Hi
I have my laptop set to log in with the password saved so I don't have to enter it each time.
I've no idea how the bet was placed or whether I was hacked or not. I know it was a day while I was on holiday and my home computer was turned off.
As my account is now closed I cannot find out.
The message from betfair said "the decision is final and we won't be able to discuss it any further on the phone, live chat, email or post"
A bit harsh I thought as I only asked them to check if I had made the bet as I hadn't knowlingly been live while away.
Geoff
Statistics: Posted by geoffs — Tue Feb 21, 2017 2:59 pm