Closed betfair account

On holiday in Barbados recently I accessed betfair practice mode on the betangel VPS via an unsecured hotel wifi.
When I returned home and logged onto betfair live mode I found that a bet had been made to empty my account.
Luckily it wasn't a large amount of money.
I topped up my account and queried the bet with betfair, both on the same day. Their response was to say i was suspected of acting illegally or fraudulently and closed my account and retained the balance which I had deposited that day.
The moral is don't use unsecured wifi
Any suggestions?
Will they let me open a new account?
geoffs
Statistics: Posted by geoffs — Tue Feb 21, 2017 1:05 pm