Re: Closed betfair account

geoff,

sounds like really bad luck . one thing i'm not 100% sure about mind you is how someone would be able to access both your vps (this requires a login via the remote desktop windows login) and then how the vps credentials (betfair login etc) could become available outside of the self contained remote desktop environment.

i would get a proper security expert to validate this but sounds like someone is fobbing you off. the exploit you think occurred would be very unlikely to happen due to the 3 layers actually being very separate.

i would also urge betfair to review the fact that you are merely reporting an issue, not trying to benefit from it by pushing them for compensation etc.
Statistics: Posted by jimibt — Tue Feb 21, 2017 1:19 pm