Re: betfair are trustable ?

That was used but I am confident it is no longer used (I am happy to be corrected).

Also several trainers refused to use it due to the chip in the saddle cloth hitting the horses on the side.

You do see it used in some countries such as Dubai but in the UK I believe it was only used for a very short period of time. That was why I said it was utter rubbish.
Statistics: Posted by andyfuller — Wed Aug 25, 2010 6:34 pm