Re: Sometimes not firing

The original bet. I can see in the log that the bet wasn't placed. It's appears to be totally random.

As in there is no entry in the log?

If so then it will be your refresh rate being set to low for the number of markets you have in Guardian
viewtopic.php?t=11491
Statistics: Posted by Dallas — Fri Oct 24, 2025 12:41 pm