Sometimes not firing

Hi All. I'm trying to create a very simple bot to place back bets on a nominated greyhound, and then take SP if not all of the stake is matched. Sometimes it fires correctly, and sometimes it doesn't (i.e. doesn't place a bet). Any suggestions as to why this might be? TIA
Statistics: Posted by dldtaylor — Fri Oct 24, 2025 11:34 am