Re: Version 1.23.0 Feedback

Please tell me I'm not going mad.... I've downloaded what appears to be the old version (1.22.1) from the download page twice now and each time I get a download complete message but when I open up BA I'm still using v1.23.1?

Regards
Doug
Statistics: Posted by followthatcamel — Wed Dec 16, 2009 10:31 pm